INSERT INTO `ccs_action` (`id`, `ip`, `protocol_type`, `operate_type`, `operate_name`, `file_path`, `plc_ip`, `order_index`, `description`) VALUES ('63', '192.168.11.166', 'HEIDEHAIN', 'StartNCProgram', '舱体线启动德玛吉机床1程序', NULL, '192.168.11.150', NULL, NULL);
INSERT INTO `ccs_action` (`id`, `ip`, `protocol_type`, `operate_type`, `operate_name`, `file_path`, `plc_ip`, `order_index`, `description`) VALUES ('64', '192.168.11.167', 'HEIDEHAIN', 'StartNCProgram', '舱体线启动德玛吉机床2程序', NULL, '192.168.11.150', NULL, NULL);
INSERT INTO `ccs_action` (`id`, `ip`, `protocol_type`, `operate_type`, `operate_name`, `file_path`, `plc_ip`, `order_index`, `description`) VALUES ('65', '192.168.11.168', 'HEIDEHAIN', 'StartNCProgram', '舱体线启动德玛吉机床3程序', NULL, '192.168.11.150', NULL, NULL);
INSERT INTO `ccs_action` (`id`, `ip`, `protocol_type`, `operate_type`, `operate_name`, `file_path`, `plc_ip`, `order_index`, `description`) VALUES ('66', '192.168.11.164', 'OPCUA', 'StartNCProgram', '舱体线启动恒轮机床程序', NULL, '192.168.11.150', NULL, NULL);

INSERT INTO `ccs_device` (`id`, `ip`, `user_name`, `port`, `password`, `server_url`, `protocol_type`, `state`, `use_state`, `description`, `disconnect_update_time`, `offline_update_time`, `timeout_remind_duration`) VALUES ('16', '192.168.11.164', 'OpcUaClient', '4840', 'HELLER1894', 'opc.tcp://192.168.11.164:4840', 'OPCUA', '', '', '恒轮机床', '2023-06-17 12:06:50', '2023-06-17 12:06:56', '0.00');
INSERT INTO `ccs_device` (`id`, `ip`, `user_name`, `port`, `password`, `server_url`, `protocol_type`, `state`, `use_state`, `description`, `disconnect_update_time`, `offline_update_time`, `timeout_remind_duration`) VALUES ('17', '192.168.11.166', 'eth04', '1900', NULL, '192.168.11.166', 'HEIDEHAIN', '\0', '\0', '德玛吉机床1', '2023-06-17 12:09:28', '2023-06-17 12:09:31', '0.00');
INSERT INTO `ccs_device` (`id`, `ip`, `user_name`, `port`, `password`, `server_url`, `protocol_type`, `state`, `use_state`, `description`, `disconnect_update_time`, `offline_update_time`, `timeout_remind_duration`) VALUES ('18', '192.168.11.167', 'eth05', '1900', NULL, '192.168.11.167', 'HEIDEHAIN', '\0', '\0', '德玛吉机床2', '2023-06-17 12:09:28', '2023-06-17 12:09:31', '0.00');
INSERT INTO `ccs_device` (`id`, `ip`, `user_name`, `port`, `password`, `server_url`, `protocol_type`, `state`, `use_state`, `description`, `disconnect_update_time`, `offline_update_time`, `timeout_remind_duration`) VALUES ('19', '192.168.11.168', 'eth06', '1900', NULL, '192.168.11.168', 'HEIDEHAIN', '\0', '\0', '德玛吉机床3', '2023-06-17 12:09:28', '2023-06-17 12:09:31', '0.00');


INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('305', '63', 'WRITE', 'DB200.306', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('306', '63', 'CHECK', '', '', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('307', '63', 'CALLBACK', 'DB200.326', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('308', '64', 'WRITE', 'DB200.308', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('309', '64', 'CHECK', '', '', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('310', '64', 'CALLBACK', 'DB200.328', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('311', '65', 'WRITE', 'DB200.310', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('312', '65', 'CHECK', '', '', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('313', '65', 'CALLBACK', 'DB200.330', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('314', '66', 'WRITE', 'DB200.302', '1', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('315', '66', 'CHECK', '', '', '', '1');
INSERT INTO `ccs_action_address` (`id`, `action_id`, `type`, `address`, `value`, `check_type`, `sort`) VALUES ('316', '66', 'CALLBACK', 'DB200.322', '1', '', '1');


INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('617', 'DB200.292', '1', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '恒轮机床加工运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('618', 'DB200.296', '1', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉1加工运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('619', 'DB200.298', '1', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉2加工运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('620', 'DB200.300', '1', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉3加工运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('621', 'DB200.302', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '恒轮机床启动运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('622', 'DB200.306', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉1启动运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('623', 'DB200.308', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉2启动运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('624', 'DB200.310', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉3启动运行状态(1:加工2:空闲)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('625', 'DB200.322', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '恒轮机床加工完成状态(1:加工完成)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('626', 'DB200.326', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉1加工完成状态(1:加工完成)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('627', 'DB200.328', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉2加工完成状态(1:加工完成)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
INSERT INTO  `ccs_tagvalue` (`id`, `address`, `tag_value`, `type`, `unit`, `protocol_type`, `ip`, `description`, `component`, `component_number`, `device_id`, `update_time`, `online_state`) VALUES ('628', 'DB200.330', '0', 'SHORT', 'NULL', 'S7_1500', '192.168.11.150', '德玛吉3加工完成状态(1:加工完成)', NULL, NULL, NULL, '2023-06-17 11:22:50', NULL);
