/*
 Navicat Premium Dump SQL

 Source Server         : localhost
 Source Server Type    : MySQL
 Source Server Version : 50728 (5.7.28-log)
 Source Host           : localhost:3306
 Source Schema         : zuihou_base_yj_0000

 Target Server Type    : MySQL
 Target Server Version : 50728 (5.7.28-log)
 File Encoding         : 65001

 Date: 09/11/2024 13:54:54
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for imcs_cutting_tool_syn_record
-- ----------------------------
DROP TABLE IF EXISTS `imcs_cutting_tool_syn_record`;
CREATE TABLE `imcs_cutting_tool_syn_record`  (
  `id` bigint(20) NOT NULL,
  `machine_id` bigint(20) NOT NULL,
  `cutting_tool_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `type` varchar(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '日志类型',
  `content` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '内容',
  `order_id` bigint(20) NULL DEFAULT NULL,
  `workpiece_id` bigint(20) NULL DEFAULT NULL,
  `create_time` datetime NULL DEFAULT NULL,
  `create_user` bigint(20) NULL DEFAULT NULL,
  `update_time` datetime NULL DEFAULT NULL,
  `update_user` bigint(20) NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
