/*
 Navicat Premium Dump SQL

 Source Server         : localhost
 Source Server Type    : MySQL
 Source Server Version : 50728 (5.7.28-log)
 Source Host           : localhost:3306
 Source Schema         : zuihou_base_yj_0000

 Target Server Type    : MySQL
 Target Server Version : 50728 (5.7.28-log)
 File Encoding         : 65001

 Date: 13/11/2024 02:54:20
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for device_state_record
-- ----------------------------
DROP TABLE IF EXISTS `device_state_record`;
CREATE TABLE `device_state_record`  (
  `id` bigint(24) NOT NULL,
  `machine_id` bigint(24) NOT NULL,
  `device_ip` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  `device_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  `device_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  `start_timne` datetime NULL DEFAULT NULL,
  `end_time` datetime NULL DEFAULT NULL,
  `device_state` int(11) NOT NULL COMMENT '设备状态(0-空闲 1-加工 2-故障 3-离线)',
  `create_date` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `create_time` datetime NULL DEFAULT NULL,
  `create_user` bigint(20) NULL DEFAULT NULL,
  `update_time` datetime NULL DEFAULT NULL,
  `update_user` bigint(20) NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of device_state_record
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
